page 3
97mm

back cover
page 6
100mm

front cover
page 1
100mm

Folded Leaflet DL

Finished Size: 100 x 210mm

Roll Fold / 6 Printed Pages

Flat Size: 297 x 210mm

Place your design within ‘Artwork’ layer and delete ‘Guide’ layer once finished. Leave pages blank where no print is required.
Failure to remove guide layer will result in template printing over artwork design.

Finished Size - This is the finished size of the product once trimmed.

Safe Area - We recommend keeping text and images out of the grey area, remaining in white box.

3mm Bleed - Please extend your artwork into the bleed if you are using full colour or imagery in the background. Anything within this area will be removed once trimmed.

• Colour: CMYK (RGB will be converted)
• Fonts: Embeded or converted to outlines
• Image Resolution: 300dpi or higher
• Crop marks and 3mm bleed are included
• Accepted format: PDF (one file)

Please ensure:

Crease - These lines will be creased to create folds. For best results do not place text across these lines.

Keep important text and images outside of this area

page 2
100mm

page 4
100mm

page 5
97mm