WIRING AREA

Wall Calendar A4 Cover

210 x 297mm

Place your design within ‘Artwork’ layer and delete ‘Guide’ layer once finished.
Failure to remove guide layer will result in template printing over artwork design.

Finished Size - This is the finished size of the product once trimmed.

Safe Area - We recommend keeping text and images out of the grey area, remaining in white box.

Please ensure:

• Colour: CMYK (RGB will be converted)
• Fonts: Embeded or converted to outlines
• Image Resolution: 300dpi or higher
• Crop marks and 3mm bleed are included
• Accepted format: PDF (one file)

3mm Bleed - Please extend your artwork into the bleed if you are using full colour or imagery in the background. Anything within this area will be removed once trimmed.

Wiring Area - Wire will be fed through this area to bind pages, avoid placing text within this space.

Keep important text and images outside of this area

Wall Calendar A4 January

Wall Calendar A4 February

Wall Calendar A4 March

Wall Calendar A4 April

Wall Calendar A4 May

Wall Calendar A4 June

Wall Calendar A4 July

Wall Calendar A4 August

Wall Calendar A4 September

Wall Calendar A4 October

Wall Calendar A4 November

Wall Calendar A4 December