550 x 394 mm

TOP

RIGHT side

LEft side

Cadbury Dairy Milk Chocolates         Best Before: 03/22
Ingredients: Milk**, sugar, cocoa butter, cocoa mass, vegetable fats (palm, shea), emulsifiers (E442, E476), flavourings. May contain nuts.
MILK SOLIDS 20% MINIMUM, ACTUAL 23%. COCOA SOLIDS 20% MINIMUM. CONTAINS VEGETABLE FATS IN ADDITION TO COCOA BUTTER.
**Equivalent of 426ml of fresh liquid milk in every 227g of milk chocolate.

BOTTOM