Bleed
This are will be trimmed. Ensure a bleed of 0.125 in is added. All background graphics or images must cover this area.
Trim Line
This is the final size your artwork will be trimmed to.
Safety Margin
Avoid placing text or important details within this area in case of trimming inaccuracies.
For more information, please check the Guide.

17.5 x 11.5 mm
0.125
17.25 x 11.25 mm

8.75 x 11.25 mm
8.5 x 11 mm