FRONT SIDE

160 mm

Template
Balloon small Ø 33 cm
Format: Ø 330 mm
Use this file in a sperate layer in your design program.
Don’t forget to hide or delete your template when saving the final PDF.
Format size to be submitted, also finished size (Ø 160 mm)